<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">;  asminit.def --
;
;  This file is part of the LZO real-time data compression library.
;
;  Copyright (C) 2008 Markus Franz Xaver Johannes Oberhumer
;  Copyright (C) 2007 Markus Franz Xaver Johannes Oberhumer
;  Copyright (C) 2006 Markus Franz Xaver Johannes Oberhumer
;  Copyright (C) 2005 Markus Franz Xaver Johannes Oberhumer
;  Copyright (C) 2004 Markus Franz Xaver Johannes Oberhumer
;  Copyright (C) 2003 Markus Franz Xaver Johannes Oberhumer
;  Copyright (C) 2002 Markus Franz Xaver Johannes Oberhumer
;  Copyright (C) 2001 Markus Franz Xaver Johannes Oberhumer
;  Copyright (C) 2000 Markus Franz Xaver Johannes Oberhumer
;  Copyright (C) 1999 Markus Franz Xaver Johannes Oberhumer
;  Copyright (C) 1998 Markus Franz Xaver Johannes Oberhumer
;  Copyright (C) 1997 Markus Franz Xaver Johannes Oberhumer
;  Copyright (C) 1996 Markus Franz Xaver Johannes Oberhumer
;  All Rights Reserved.
;
;  The LZO library is free software; you can redistribute it and/or
;  modify it under the terms of the GNU General Public License as
;  published by the Free Software Foundation; either version 2 of
;  the License, or (at your option) any later version.
;
;  The LZO library is distributed in the hope that it will be useful,
;  but WITHOUT ANY WARRANTY; without even the implied warranty of
;  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;  GNU General Public License for more details.
;
;  You should have received a copy of the GNU General Public License
;  along with the LZO library; see the file COPYING.
;  If not, write to the Free Software Foundation, Inc.,
;  51 Franklin Street, Fifth Floor, Boston, MA 02110-1301, USA.
;
;  Markus F.X.J. Oberhumer
;  &lt;markus@oberhumer.com&gt;
;  http://www.oberhumer.com/opensource/lzo/
;

.386p
.model flat
.code

ifdef __MASM__
option casemap:none
endif
ifdef __TASM__
endif
ifdef __WASM__
endif
</pre></body></html>